## Android

### Min SDK version

Thermion requires Android SDK version 22, so change your `app/android/build.gradle` to match this version or higher：

```groovy
 defaultConfig {
    ...
        minSdk = 22
    ...
    }
```

### Shrink/Minify Resources

In release mode, you must add the following to your `app/build.gradle`:

```
    buildTypes {
        release {
            shrinkResources false
            minifyEnabled false
        }
    }
```